¢á╟∩á to a New Section¢¢Example usage:¢¢Go¢Go [section name]¢¢ Entering the command "Go" will allow you to switch from the section you are currently in, into another section.  If you do not type a section key-word after the word GO, Carina II will execute a SECTIONS command, and then prompt you for the key-word of the section you wish to enter (see "Sections" for more information on this command).¢